IQMD HM Au+Au E=400 AMeV

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 2 4 6 8 10 12 r.p. resol. / corr.

Λcos(Φ_1-Φ_2)Γ

1/Λcos(Δϕ)Γ

0 0.05 0.1 0.15 0.2 0.25 0.3

0 2 4 6 8 10 12 b (fm)

Integrated v_1 true r.p.

rec.r.p.+cor.

Z=1, y^{(0)}Γ0